PowerPC � Reference Platform

Architectural Aspects of Power Management

FinalDRAFTofWhitePaperforPublication

February16,1995

AndrewR.Rawson,AdvisoryEngineer PowerPersonalSystemsArchitecture,Austin,TX Releasedforexternalpublication,Feb.15,1995

Abstract

Powermanagementisasetofhardwareandsoftware facilitiesusedtooptimizepowerconsumptioninacomputer systemorperipheral.Theparticularfocusofthispaperis powermanagementinPowerPC� microprocessor–based

computers.

Although power management originated in mobile computers, it has become an important consideration in other environments as well. This paper first gives an overview of the motivating factors which led to the extension of the principles of power management to non–portable computers. It then presents a specific philosophy of power management and defines system–level requirements for both the hardware and software. Next a structural framework for power management software is presented to facilitate the discussion of architectural issues. It is demonstrated that the concepts of power management impact both operating system, and ultimately application software. A recommended set of system power states and allowable transitions is defined and the concept of device power state is discussed. Finally the issues of requisite extensions to system configuration management and system firmware are considered.

It is argued that power utilization can be optimized only through synergy between the operating system power management facilities and power management–aware application software. This paper gives a staged strategy for reaching this cooperative situation.

1.0 Introduction

The PowerPC� Reference Platform Specification [1] provides a methodology which allows developers of PowerPC� microprocessor–based computer systems to design platforms which can run a wide range of operating systems and share applications. As will be explained, power management is an important new element of system design not only for portable computing, but now also for non–mobile home and office environments.

This paper presents architectural aspects of power management that are of interest to both hardware and software developers. The requirements outlined in this paper should be seriously considered in the design of future PowerPC� Reference Platform–compliant systems and are embodied in products being designed by IBM’s Power Personal Systems development organizations in Austin, Texas and Yamato, Japan.

2.0 Power Management Motivation

Although the initial impetus for power management was the extension of useful operating time for mobile computers, with the growing number of personal computers and a heightened awareness of the need to conserve energy, the scope of power management has broadened to include non–mobile computers. One of the main tenets of the personal computer revolution has been to increase the availability of computing power to the user while at the same time decreasing the cost per user. While this effort has been very successful, the down side of increased

� International Business Machines Corporation, All rights reserved, 1995. PowerPC� , Smart Energy System� , and Rapid Resume� �are�trademarks of IBM Corporation.

availability is that most personal computers sit idle the vast

majority of the time.[2] During these times of inactivity

most desktop computers continue to consume electrical

power at a level only slightly less than when in use. So

while the cost per user of the hardware has declined, another

important aspect of the total operating cost associated with

providing this very high level of availability has largely

been ignored.

As the industry moves into the world of multimedia, video

conferencing, and real–time applications, the trend is

toward an increase in demand for reserve computational

power . The semiconductor technology of microprocessors

and support logic has moved from bipolar transistor to

CMOS which inherently consumes less power. Despite this

fact, as clock speeds escalate to attain more performance,

systems continue to increase their power consumption.

Moreover , the addition of more and more complex add–in

adapters and external peripherals compounds the problem.

At odds with the drive toward more powerful computers is

the desire to have smaller, cooler, quieter machines. Power

management is a significant part of the solution to these

conflicting requirements. The goal of power management

is to reduce the average power usage of a computer system

without reducing availability. Lower power consumption

naturally results in lower heat generation, which allows

components to be packed more densely and require less

supplemental cooling. Denser packaging enables

smaller–sized systems. Since supplemental cooling is

normally supplied via fans and fans generate noise,

eliminating the need for a fan is tantamount to the goal of

eliminating noise.

Another force at work is concern for the environment. The

generation of power impacts the environment due to the

production of pollutants, carbon dioxide, and waste heat.

Eliminating any unnecessary usage of electrical power is

thus an opportunity to reduce pollution. Electrical power

generation also consumes increasingly scarce

non–renewable energy reserves.

In the United States, the Environmental Protection Agency

has addressed this opportunity by instituting a program

called Energy Star Partners.[3] The EPA has taken the

approach of encouraging industry to respond voluntarily to

improve the energy efficiency of computer systems instead

of requesting new legislation. The manufacturers of

computer equipment have responded by bringing Energy

Star–compliant computers to market. Success of these products encourages other manufacturers to offer Energy

Star–compliant products.

3.0 History of Power Management

The most popular operating system for the

IBM–compatible personal computer originally had no

provision for power management. As this operating system

was placed on battery–powered mobile computers, the

system designers were forced to add power management in

a manner that did not impact the existing system software.

This led to some hardware–only solutions to the problem of

power management in portable systems. These hardware

mechanisms relied on reducing the clocking rate to various

subsystems (the CPU, memory controller, and the

peripheral bus controller) to reduce their power

consumption during times when the demand for these

resources was low.

The current state of the art in power management employs

changes to both system software and firmware[4,5].

System software is augmented with a power management

device driver, system utility programs, and extensions to the

system firmware. Once a cooperative interface has been

established between the power management device driver

and system firmware, the power management device driver

takes over control the power state of system I/O devices.

Power management event notification messages are passed

up from devices through the power management extended

system firmware to the power management device driver

from whence they can be broadcast as system messages.

These messages can be monitored by

power–management–aware application programs.

Applications may also send requests for device power state

transitions to the power management device driver which

forwards these to individual device drivers to effect the

control of device power states. The approach presented in

this paper extends and enhances this model.

4.0 Power Management Philosophy

The basic principle of power management is very simple ––

turn off anything not currently in use. This same principle

applies to conserving energy in a home, for example.

The complication in applying this principle to computer

systems is that an application may need access to a resource

immediately after it is powered down. This would be no

problem if the resource that was powered down could come back online instantaneously. While electro–mechanical

devices like hardfiles and CD–ROMs obviously need time

to come back up to an operational level of responsiveness,

even non–mechanical devices such as I/O bridge chips

require time and attention from software to return to an

operational state after a period of power loss. Any

application that is waiting on a resource to come back online

is not getting its intended task accomplished.

A second fundamental problem is increased wear in devices

and subsystems due to turning power off during times of

inactivity . Hardfiles, for example, experience significant

wear and resultant increases in failure rate when power to

the spindle motor is cycled frequently. This is due to

read/write head erosion as it repeatedly lands on the platter

surface. Even solid state semiconductor devices are not

exempt from this problem. These devices show wear

ef fects primarily due to the thermal cycling which results

from repeatedly removing and applying power. Finally, the

ener gy required to bring a device from a lower power state

to a higher, more responsive power state must be taken into

consideration.

In the power management approach described in this paper,

the operating system bears the responsibility of allocating

system resources in a manner that takes into consideration

both the current power state of all system resources and the

resource requirements of all currently active applications.

For example, the operating system may prioritize a task

which requires only resources which are currently available

over one which requires one or more resources that are not

available having been placed in a power–savings mode. At

the same time it would initiate the process of bringing the

required resource up to a state which meets the requirement

of the waiting application. Carrying this out requires

knowledge of the resource requirements of all the tasks at

hand. This type of information is not usually available.

There is really only one reliable way of knowing the

resource requirements of an application –– the application

developer must provide this information. A mechanism

needs to be set up to convey such information to the

operating system. This can be accomplished either by the

application itself via operating system calls or by a task

description language which can execute in a command

script prior to the invocation of the application.

In lieu of this explicit resource description, the operating

system is forced to make a prediction based on experience with the resource utilization of a given application. Taking

advantage of the principles of physical and temporal

locality we can make a guess about the future resource

requirements of an application based on history. This type

of knowledge is always imperfect, however, leading to

performance bottlenecks.

As performance becomes more of an issue (as it is any

real-time application), application developers will be

motivated to use these new mechanisms to inform the

operating system of application requirements both at

invocation and during runtime as requirements change

dynamically . As applications are enhanced to take

advantage of the power management capabilities of the

operating system, it becomes possible to view power as a

schedulable resource. It will also be possible to inform the

user of resource requirement conflicts which may impact

real–time performance.

5.0 System Hardware Requirements

The design of a power–managed computer presents the

system designer with several new requirements. These

include the following changes to system hardware:

– Redefinition of the electro–mechanical function of

the main power switch

– Functional changes to the power supply

– Additional power supply and, possibly, clock

control logic

– Changes to the system firmware

– Possible addition of new indicators

– Consideration of power cycling on reliability

In addition the system hardware designer must supply new

types of information to the operating system which were not

required in non–power–managed systems. Finally, the

designer must work to encourage the incorporation of

power management facilities in new support chips and

subsystems.

5.1 System Functional Requirements

The electrical and mechanical function of the main power

switch is redefined in a power–managed system. In a conventional non–power–managed computer, the position

of the main power switch usually represents the current

state of the power in the system. In the power–managed

system, this is not necessarily the case. The power switch,

therefore, should be a mechanically stateless momentary

contact switch.

The significance of actuating the power switch changes. It

now becomes a system power state transition request to the

power management software. Software must be in control

of the state of the secondary power circuits. This requires

changes in the function of the power supply. A logic signal

input to the power supply must be provided to allow turning

on and off the secondary voltages. For AC–powered

systems, this has the side benefit of eliminating the internal

wiring of AC power from the rear of the machine to the front

where the power switch is located.

Since opening and closing the primary circuit no longer

controls the system power, logic to turn system power on

and off must be provided. For AC–powered systems, this

logic may be battery–powered, powered by an always–on

auxiliary secondary, or a combination of both. This logic

will most likely be supplied by a microcontroller and its

embedded firmware. This is referred to as the power

management controller. This controller may need to

provide general purpose I/O pins for the sensing and control

of subsystems that have no direct software–controllable

power management facilities.

If power consumption in certain subsystems is reduced by

slowing or stopping one or more clock signals, the system

designer must supply software–controllable logic to

provide this function. Consideration should be given to

providing power islands on the motherboard to allow the

removal of power from certain subsystems to reduce power

consumption. The control of power to add–in adapters will

become a possibility as the industry moves to

self–identifying adapters. Logic could be added to remove

power from adapters during periods of inactivity defined by

the power management software.

Another change is that the power indicator which is present

on most systems will be used to indicate more than just two

states (on and off) of system power. The power

management software must be able to control this indicator.

It may be desirable to add a suspend indicator and/or a

suspend request button. See Section 7 for a description of

system Suspend.

Since turning off the power is now the responsibility of the

power management software, it may be desirable to provide

a watchdog timer. This timer would provide the control

signal to the power supply to turn off the secondary voltages

in the event that the power management software fails to

complete its task. The designer may also wish to include a

system wake–up alarm within the power management

controller .

The power management logic will not provide I/O activity

monitoring for the purpose of determining the idleness of a

device or subsystem. In general this is the responsibility of

the power management software. However, if the CPU

clock is stopped during suspend to save power, logic must

be supplied to detect any supported resume events in order

to wake up the CPU on these events. Resume events are

discussed in Section 7 below.

The power management controller is further discussed in

Appendix A. Required changes to the system firmware will

be discussed in Section 12.0 below.

In a power–managed system the reliability of packaging

and electromechanical storage subsystems must be

examined carefully. For example, it may be necessary to

specify a hardfile which has been designed and tested to

endure more than the normal number of start/stop cycles for

use in a power–managed system than would be required in a

system without power management.

5.2 New Information Provided to Operating System

The onus is on the hardware designer to describe platforms

in enough detail to enable the operating system provider to

determine how to manage the system power usage. The

system designer must characterize the power usage of

subsystems in detail. Not only does the operating system

need to know the power utilization of all supported device

power states, it also needs to know the penalty in terms of

time, power, and wear to move from one device power state

to another. The system designer must describe the topology

of any power distribution and/or clocking control

structures.

This information must be conveyed from the system

firmware to the operating system either via residual data

(see reference 1 for a description of residual data) or data

returned via boot time calls.

5.3 Future Requirements

System designers must work with support chip

manufacturers to propagate power management facilities

into all motherboard subsystems and work with

independent hardware designers to provide add–in adapters

which support power management. In addition system

designers should encourage electromechanical data storage

subsystem manufacturers to consider new methods of

conserving power in the larger form–factor devices while

mitigating the detrimental effects of wear on device

reliability just as they have in the smaller form–factor

devices used in portable battery–powered systems.

6.0 Operating System Requirements

Placing the responsibility for the power management policy

implementation on the operating system provider leads to

some interesting problems for the system designer. The

system designer has a vested interest in complying with

domestic and international standards for energy

conservation. Although certain strategies are bound to

reduce the usage of electrical power (such as spinning down

any hardfiles which are not in use), no one strategy can

guarantee compliance with the EPA ’ s Energy Star

guidelines, for example, on all computing systems. Thus

each system designer must place requirements on the

operating system provider that will insure compliance with

these standards.

According to the philosophy presented in this paper, the

operating system software bears the responsibility to

manage power within the computer system. The following

sections elaborate on the specific system level structures

and facilities required to carry this out.

7.0 Definition of Power Management System

States

Since the system software provides the power management

policy of the system, it can implement as many

system–level power states as the designer of this software

can conceive. However, for consistency the following

system power states are recommended. In some

implementations one or more of these states may be

combined.

7.1 System Power States

The suggested system power states are: Power

Management Disabled, Power Management Enabled,

Standby , Suspend, Hibernate, and Off.

7.1.1 Power Management Disabled

In this state the system is its most responsive to the

application. It may also be the state where power usage is

maximum. All devices are inhibited from entering any of

their supported lower power states.

7.1.2 Power Management Enabled

The Power Management Enabled state is the state in which

a power–managed system spends the majority of its

operational time. This state has a very large number of

substates because the current power utilization of the

system is dependent on the current power state of every

device which constitutes the system. While the power

management software is in the Power Management

Enabled state it is not static, but is actively engaged in the

control of the device states with the goal of maximizing

some given set of system performance parameters.

In this state the system is completely operational. Various

devices may be commanded by the power management

software to move to lower power states –– either Power

Managed or Suspend. (See the definition of device power

states below.) This may increase latency when the

application(s) require service from these devices. In

general, however, the increase in response time should not

be noticeable to the user.

7.1.3 Standby

Standby is intended to be the lowest power state where the

system is responsive to interrupts from all sources. The

CPU is placed in a low power mode if one is available.

However , the CPU is still in control of the system and does

not require a hard reset on resumption. Power management

software will place all I/O devices in either Suspend state or

Device Off state (see the definition of device power states

below) unless the device is involved in generating or

routing interrupts and needs to be in a higher power state.

Operational parameters (register values) are retained within

the devices. No data loss occurs in Standby. Any I/O

interrupt will cause an immediate transition back to the

Power Management Enabled State. All communication

sessions are maintained in this state.

7.1.4 Suspend

After operational parameters of peripheral devices and the

contents of both the L1 and write–back L2 caches are saved

to main memory, these devices will be powered off, if

possible. Main memory itself is put in a low power data

retention state (e.g., for Dynamic RAM, slow refresh). All

I/O devices not necessary to the detection of suspend

resume events will be placed in their Off states.

The CPU is not executing instructions and will not respond

to external interrupts. The CPU may not retain its internal

state, and thus may require a hard reset and subsequent

reinitialization to move to a more responsive state.

Communication sessions are not maintained when the

system is in the Suspend state. Any communication

sessions will have to be reestablished by the user upon

returning to the Power Management Disabled or Power

Management Enabled states.

The transition from the Suspend state to one of the more

responsive states is called Resume. A suspend resume

event initiates the transition to the Power Management

Enabled state.

7.1.5 Hibernate

Prior to entering the Hibernate state, the operational state of

the system must first be saved to main memory. This

process is the same as the process of preparing for Suspend

described above. Preparation for Hibernate, however,

requires an additional step. After the operational state of the

system is contained in main memory, an image of main

memory must be written (usually in compressed form) to a

non–volatile secondary storage medium. During this time,

devices that are necessary to the process will be brought to

their Device On states.

If this process is successful, it will be possible on reboot of

the system to restore the operational state of the system to

one which is indistinguishable to the user from the state of

the system prior to the time that the transition to hibernate

took place. An exception is communication sessions which

will have been broken and will need to be reestablished by

the user after the operational state of the system has been

restored.

If this preparation for Hibernate process is not successful,

due to some internal error or insufficient space on the non–volatile secondary storage medium, the power

management software should abort the transition to the

Hibernate state and give the user an indication that an error

has occurred. The power management software should also

allow the user to abort the prepare for hibernate process,

especially if this process requires a perceivable amount of

time (say, > 30 seconds). This is known as a user–initiated

Hibernation Abort event.

If none of the exception conditions described above occur,

the system should move immediately to the Hibernate state.

In the Hibernate state the system is not operational. All

communication channels are inoperative. Power usage will

not be zero in this state, but to the user all indication that the

system is powered will be absent. Power usage should be at

an absolute minimum, especially for battery–powered

mobile systems. For non–mobile systems, power may be

drawn from a battery or, if the unit is currently attached to an

active AC main, from this source.

User input (e.g. depressing the power switch) will be

required to leave this state. The CPU will experience a

hardware reset. At least an abbreviated Power–On Self Test

will be performed. The transition from Hibernation shall be

to the Power Management Enabled state. The restoration of

a former operational state from the Hibernate state is called

W akeup.

7.1.6 Off

In this state the system is not operational. All

communication channels are inoperative. Power usage will

not be zero in this state, but to the user all indication that the

system is powered will be absent. Power usage should be at

an absolute minimum, especially for battery–powered

mobile systems. For non–mobile systems, power may be

drawn from a battery or, if the unit is currently attached to an

active AC main, from this source.

User input (e.g. actuating the power switch) is required to

leave this state. The CPU experiences a hardware reset and

A Power–On Self Test is be performed. The terminal state

of this transition shall be the Power Management Disabled

system state.

7.2 Power Management System Power State

T ransition Diagram

The following figure gives the suggested system power

state transitions and the events that cause the transitions.

PM

Disabled

Of f

Standby

PM

Enabled

Suspend

Hibernate

Figure 1. Recommended System Power State Transi -

tion Diagram

NOTE: Depressing the Power Switch in the system

power–managed states of Standby, or Suspend causes

a transition back to PM Enabled to confirm that a tran-

sition to the Hibernation state is desired.

Power Switch

PM Enable

PM disable

User Request

or Inactivity

Resume Event

I/O Interrupt

User Request

or Inactivity

User Request, Inactivity,

Power Switch, or Lid

Closed

W akeup

Event

Suggested resume events are

– power switch actuation

– keyboard input

– mouse input on a non–portable system

1

– click button depression on a mobile computer

system

– lid open in computers that have a lid/display which

covers the keyboard or pad

– modem ring indicate

– one time or periodic timer alarm

Suggested wake–up events are

– power switch actuation

– modem ring indicate

– timer alarm

7.3 Resume

Resume is defined to be the process of restoring the system

to the operational state that existed prior to the transition to

the Suspend system state. In many system implementations

the CPU will experience a hard reset at the outset of the

Resume process. A hard reset causes control of the CPU to

be passed to system firmware. Firmware must determine

whether control was passed to it as a result of a Resume

event or if a cold boot is required. A discussion of firmware

considerations is given in Section 12.0 below.

After reinitializing all standard motherboard devices,

firmware transfers control to a restart entry point which is

passed to firmware via system NVRAM. Code at this entry

point will effect a task switch back to the process which was

active prior to the system Suspend request.

7.4 Wakeup

W akeup is defined to be the process of restoring the system

to the operational state that existed prior to the transition to

the Hibernate state. The image of the system state which has

been saved to a secondary non–volatile storage medium is

brought back into main memory. The remainder of the

process proceeds just like the Resume process.

W akeup may or may not require changes to system

firmware depending on the implementation of the boot

process. An operating system which normally employs a

boot loader will not require firmware support for Wakeup.

An operating system which has no boot loader and relies on

the firmware to load an executable image of the system

software requires modification to the firmware to redirect

the loading process to read the saved system image instead

of the normal cold boot image.

8.0 Defined Device States

At any given moment the current power utilization depends

on the power state of all devices in the system. To optimally

utilize certain devices the power management software

may need to have special knowledge about a device’s power

management attributes. However, to deal with devices in a

1. Mouse movement on a portable system is not a reliable indicator of user interaction. Vibration during transportation of

portable systems can cause mouse input changes.

uniform way, it is useful to conceptualize device power

states.

Devices may have built–in power management functions

that are not controllable via software. These functions are

beyond the scope of this document since they are

transparent to the operation of software.

The following section defines power management states for

devices. Devices must implement the full set of power

states or a proper subset thereof. A device that implements

such a subset must make its capabilities known to its device

driver which will handle requests for transitions to

unsupported states by substituting an appropriate supported

state.

8.1 Device States

The suggested device power states are: On, Power

Managed, Suspend, and Off. These are discussed in the next

sections.

8.1.1 Device On

In this state a device is fully functional. Latency in

servicing requests is at its minimum.

8.1.2 Device Power Managed

The device is in this state is fully operational although some

requests for service from the software may experience

increased latency. All operational parameters are retained

within the device. The device responds to software

commands to move to higher or lower power states. Within

this state there may be a number of substates that differ in

terms of latency and power usage.

8.1.3 Device Suspend

In this state the device is not immediately functional

although all internal operational parameters are retained.

Power is utilized in the Device Suspend state only to

maintain the static state of internal operational parameters.

This should be the minimum power usage level other than

Device Off.

Restoration to Power Managed and On states is possible, but

requires software intervention. This process is called

device resume. If suspend involves the freezing of the

clock(s) driving the device, power management software needs to control this process by communicating with the

parent of the device. See the discussion of the clock

distribution tree in Section 11.0 below.

8.1.4 Device Off

In this state power is removed from the device and the

device is not functional. Internal operational parameters

are not retained by the device. Reinitialization of the device

by software is required.

Restoration to Power Managed, Suspend, and On states is

possible, but requires software intervention. This process is

called device wakeup. Turning device power on or off

requires the agency of a third party. This third party is

identified as the parent of the device in the power

distribution tree. See the discussion of the power

distribution tree in Section 11.0 below.

9.0 Power Management Event Sources

A power management event (PM Event) is any event which

may affect the power state of a device or the system.

PM Events can be classified as:

– Requests for transition to a more responsive system

state (e.g. modem ring indicate, real–time clock

alarm, or power switch depressed)

– T imer underflow events indicating a period of

software–detected inactivity

– Power loss imminent warnings (battery low or

critical, AC outage). These will generally result in

an attempt to move to a lower system power state.

A PM Event is abstracted as PM Event Source Object which

encapsulates information concerning how the event is

signalled in the hardware and how the event is cleared.

The following is a list of some of the possible PM events:

Mouse movement

Keyboard activity

Ring indication

Real–T ime Clock Alarm

Backlighting adjusted (user is adjusting the intensity

control knob)

Power switch actuation

Hard drive activity

CD–ROM activity

External PM request (could be used to control power

remotely)

Battery low

Suspend timer underflow

Hibernate timer underflow

General purpose timer underflow

Lid open, close

PCMCIA socket services required

10.0 Power Management Software Structure

T o facilitate the following discussion of architectural

aspects of power management software, please refer to

Figure 2 which gives a conceptual view of a power

management–enabled operating system.

Command Script

Non–PM–

A ware

Application

PM–A ware

Application

Non–PM–

A ware Ap-

plication

PM Control

Panel GUI

App

Layer

Kernel

Layer

PM

Executive

T ask

Scheduler

Add–in

Adapter

Device

Driver

with

Power

Managem’t

Capability

Device

Driver

Layer

Device Drivers for

support chips w/

power states

RT AS Runtime Abstraction Software with PM Extensions

System I/O and Power Mngmt Hardware Registers

Adapter

Registers

Hard -

ware

Figure 2. Power Management Software Structure

Integrated Device

Driver w/ Power Man-

agement Capability

Loader

Command Script

Power management software should be structured to

separate the user interface from the power management

policy and to separate the policy from the mechanism. This

allows for modularity, code reuse, and ease of

dif ferentiating the look (by supplying a new user interface)

or the function (by supplying a new policy) of the power

management subsystem.

At the highest level this conceptual view shows several

types of applications. All of these are currently active and

sharing the resources of the computer system. A PM–aware

application is one that has been written to take advantage of the power management capabilities of the operating

system. Also active in the system may be one or more

non–PM–aware applications. A special PM–aware

application called the PM Control Panel provides the user ’ s

interface to power management. This provides a graphical

user interface (GUI) and employs all the interaction

metaphors standard to the particular operating system. A

command script is an interpretive language used to manage

application programs. Embedded within a command script

may be a task description which is employed to register the

resource requirements of an associated application. This

application may either be PM–aware or non–PM–aware.

The central control point for power management is called

the PM Executive. The PM Executive receives system

power state transition requests from the PM Control Panel,

PM–aware applications, and possibly task descriptions

embedded in command scripts and must resolve possible

conflicts between these requests. It receives event

messages from device drivers or via interrupt handlers and

broadcasts significant events to the PM–aware applications.

The PM Executive generates requests for device power

state transitions which it sends to the appropriate device

drivers. The PM Executive can be integrated in the

operating system kernel, or exist as a kernel extension or

privileged user–level application, but must coordinate its

activity with that of the Task Scheduler.

The purpose of the Task Scheduler is to select a process

from a queue of waiting processes and grant the selected

process control of the CPU. The Task Scheduler of a power

management enabled operating system uses knowledge

about the application mix’s resource requirements to

optimize performance within the current power constraints.

These requirements can come from PM–aware applications

directly or be communicated on an application’s behalf by a

task description language. The Task Scheduler uses this

information to build a resource list which it associates with

the process set up by the Loader to execute the application.

This is maintained in a data structure called the Task List.

T ask Scheduler informs the PM Executive when various

system resources need to be brought to new power states to

satisfy the requirements of the executing applications. The

T ask Scheduler maintains queues of processes waiting on

the availability of system resources and cooperates with the

PM Executive in making decisions to effect the transition of

resources to higher or lower power states.

Although the power management policy may be

implemented in a centralized executive, the power management mechanism should be implemented in a

distributed manner by power management extensions to the

individual device drivers. Device drivers are shielded from

hardware differences across system implementations by

code called runtime abstraction software (RT AS).

10.1 PM Control Panel

The following specifies some of the user interface

requirements for the PM Control Panel.

The PM Control Panel should provide:

– user control of enabling or disabling power

management

– a user–selectable option or icon to go immediately

to the Suspend system state

– a user–selectable option or icon to immediately go

to the Hibernate state

– a dialog box to set the time-out value to trigger a

transition to the Suspend state

– a dialog box to set the time-out value to trigger a

transition to the Hibernate state

– for systems in which the lid/display folds down and

covers the keyboard, a means to select a transition

to Suspend, Hibernate, or Off on lid closure

– for all systems, a means to select a transition to

Suspend, Hibernate, or Off on power switch

actuation

– for all battery–operated systems, a graphical ”fuel

gauge” representation of remaining battery energy

and/or a digital presentation of estimated time to

battery critical low condition

– on battery–operated systems, a selectable option to

go to Suspend or Hibernate on a battery critical

condition

– a means to enable and disable various resume and

wake–up events

10.2 Power Management–Aware Applications

Applications that are written to take advantage of the power

management capabilities of the system have one or both of

the following characteristics:

– The application registers its resource requirements

early in the initialization section.

– The application informs the operating system when

its requirements for various system resources

change.

Existing applications and new applications which are not

written to take advantage of the power management

capabilities of the operating system are accommodated in

this architecture. These applications can be adapted to take

advantage of the power management–capable operating

system by supplying a task description to be associated with

the application.

10.3 Power Management Extensions to Device

Drivers

Device drivers for both integrated and add–in devices

require extensions to handle requests from the PM

Executive to effect the transition of a device between its

supported device power states. The device driver must

understand the capabilities of the device it services.

Since most devices do not retain their operational state

when power is removed, the device driver is responsible for

restoring the operational state of a device after a period

when power has been removed. The device driver must

either retain the state of any hardware registers which affect

the operational characteristics of the device and provide a

method for reinitializing these registers, or be able to

reconstruct the contents of all device registers

algorithmically . If the device driver does not modify the

state of a register from the value set by boot time firmware,

this restoration process is not required.

The device driver is also responsible for monitoring its

attached device(s) for inactivity. The power–management–

enabled device driver will signal the PM Executive when a

device has been inactive for a specified period of time. The

device driver should also support queries from the PM

Executive concerning the current level of activity of

devices.

Certain devices that do not normally need device drivers

(e.g. L2 cache controllers, memory controllers, I/O bridges,

programmable interrupt controllers, and DMA controllers)

may require them in a power–managed system to control

the saving and restoration of the hardware state when these

devices are turned off and on. These device drivers also

control any supported lower power modes of these devices.

1 1

1 1.0 Power Management and System

Configuration

This discussion must assume that there exists a global

configuration manager. A configuration manager maintains

a possibly dynamic list of all the devices currently

configured and available in the system. The power

management attributes of all devices must be included in

this database. Specifically, the configuration database tells

if the integrated device or plug–in adapter and device driver

supports power management. It also specifies any power

management event sources that might be associated with

the device.

This database must describe the topology of any power

and/or clock trees. In many systems the distribution and

switching of power will have a single control point.

However , to make the model more general, power

distribution and control is conceptualized as a hierarchical

tree. The parent controls all the power to its children.

Also involved in the management of power consumption in

a system is the control of clocking. Clocking rates to

various subsystems can be controlled. The structure of this

control is conceptualized as a second hierarchical tree.

Since the power distribution and clocking structures of

systems are usually different, the clocking tree is

represented in a manner independent of the power tree.

1 1.1 Power–Managed Device Attributes

The configuration database contains information

describing the power management attributes of all the

devices currently configured.

For each supported power state of each device the following

information is available:

– power dissipation at this state

– power required to make the transition to the next

higher or lower state

– delay to complete the transition to the next higher

and next lower power state

– any restrictions on the cumulative number or

frequency of transitions between device power

states due to device wear characteristics

12.0 System Firmware

Power Management must be considered in the design of

system firmware. System firmware receives control

whenever the CPU sees a hard reset. In a power–managed

system, however, a reset to the CPU no longer necessarily

means that a cold boot is desired. The firmware must make

a determination during the boot process as to whether this is

a cold boot or a Resume from System Suspend.

The boot process for a Resume must differ from a cold boot.

For example, since main memory contains an image of the

system state at the time of suspension, certain areas of

memory should not be written by the firmware. Self test

routines that write to memory should be skipped or directed

to avoid areas of memory known to contain essential data.

Also, since the operating system is already resident in

memory , it does not need to be loaded from the boot device.

The Wakeup process may require a change to system

firmware to support operating systems which do not employ

a boot loader.

Firmware must handle changes made to residual data to

support the description of the power–managed device

attributes. In the future as boot–time calls to firmware from

the operating system are supported, firmware must return

power attributes in response to device tree queries.

13.0 Summary

This paper has proposed a common framework for power

management in both non–mobile AC–powered computer

systems as well as battery–operated mobile computers. It

has explored how power management principles permeate

the hardware, firmware, operating system, and application

software of a power–managed system. A new level of

cooperation is proposed between power

management–aware applications and the power

management–capable system software and hardware. This

new synergy portends the design of an optimally

power–managed system. The user will benefit as the

reserve computational capacity of systems increase while at

the same time the average power requirements decrease.

Ultimately the environment benefits as well.

Reaching this goal, however, requires the cooperation of

component manufacturers, system hardware designers,

operating system providers, and application software

developers.

Appendix A: Power Management Controller

System Interface

The power management controller must sense PM events

and combine them in software–programmable ways to

generate a power management interrupt to the CPU.

The power management controller must provide a

command/status interface to the power management

software. The following is a list of generic commands:

Generic Commands

– enable/ disable power switch scanning

– read the current (debounced) state of the power

switch (open or closed)

– read information that gives the event or reason that

power was turned on

– control watchdog timer, if one is provided

– load a value into a timer, reset the timer, determine

what event the expiration of a timer will generate

(turn power on, generate an interrupt, or just set a

bit which software can poll)

– determine which external events generate a PM

interrupt

– control and sense any general purpose I/O provided

by the PM controller hardware

– control any indicators

– set number of ring indicate pulses required to

generate an event

Refer ences

1. PowerPC � Reference Platform Specification, Version

1.1, IBM Corporation, Austin, TX, January 1995. Posted on the IBM forum on Compuserv and Prodigy.

2. L. Norford and C. Dandridge, ”Near–Term Technology Review of Electronic Office Equipment”, Conference Record –– IAS Annual Meeting, vol. 2, 1993.

3. For information on the EPA’s Energy Star Partner’s program dial the EPA Energy Star Fax line at (202) 233–9659.

4. S. Pancoast and D. Crump, ”White Paper on IBM’s Smart Energy System� and Rapid Resume� ”, dated September 2, 1994. Posted on the IBM forum on Prodigy and Compuserv, October 1994.

5. Advanced Power Management (APM) – BIOS Interface Specification, Revision 1.1, Intel Corporation/ Microsoft Coporation, September 1993.